E SG+Al one lambda

E SG+Al two lambda

H SG+Ag one lambda

H SG+Ag two lambda

J SG+Ag one lambda

J SG+Ag two lambda f or -A bA

0.10

0.15

0.20

0.25

0.30

bA f-A