range_cm_p28p65

Entries 9999

Mean 0.1456

RMS 0.02334

stopping position (cm)

0.1 0.12 0.14 0.16 0.18 0.2 0.22 muons

0 100 200 300 400 500 600 700 800_{range_cm_p28p65}

= 2.0% p pΔ <p> = 28.65 MeV/c,

= 1.5% p pΔ <p> = 28.93 MeV/c,

= 1.0% p pΔ <p> = 29.22 MeV/c,

mμ 127