momentum (MeV/c)

0 10 20 30 40 50 θ cos

-1.0

-0.8

-0.6

-0.4

-0.2 0.0 0.2 0.4 0.6 0.8 1.0

-10

-5

0

5

10 Normalised residuals Prob 0.8112

Constant 4.8±

194.4 Mean 0.02030 ± -0.01061 Sigma 0.0140 ± 0.9931

σ (data-simulation)/

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 20 40 60 80 100 120 140 160 180 200

Prob 0.8112 ± ± Residuals in fiducial only

momentum (MeV/c)

15 20 25 30 35 40 45 50 55 σ (data-simulation)/

-4

-2

0

2

4

θ cos -1.0 -0.8 -0.6 -0.4 -0.2 0.0 0.2 0.4 0.6 0.8 1.0 σ (data-simulation)/

-5 -4 -3 -2 -1 0 1 2 3 4 5