θ 1/cos

-2.0 -1.5 -1.0 -0.5 0.0 0.5 1.0 1.5 2.0 endpoint p-difference (MeV/c)

-0.010

-0.005

0.000

0.005

0.010

0.015

0.020

0.025

0.030 Nominal data and simulation