run number

50670 50675 50680 50685 50690

T1TopCurrent mean,T1LeftCurrent mean,T1RightCurrent mean,T1BottomCurrent mean

-1 0 1 2 3 4 5 6 T1TopCurrent mean T1LeftCurrent mean T1RightCurrent mean T1BottomCurrent mean