difference in p (MeV/c)

-10 0 10 20 30 40 events

210

310

410

510 Simulation: brem deltas, DS

difference in p (MeV/c)

-10 0 10 20 30 40 ratio

0 1 2 3 4 5 ratio of Data: brem deltas, DS and Simulation: brem deltas, DS

difference in p (MeV/c)

-10 0 10 20 30 40 events

210

310

410

510 Simulation: brem deltas, DS

difference in p (MeV/c)

-10 0 10 20 30 40 ratio

0 1 2 3 4 5 ratio of Data: brem deltas, DS and Simulation: brem deltas, DS