momentum (MeV/c) δ -10 0 10 20 30 40

’sδ number of reconstructed

0

200

400

600

800

1000

Simulation: DC deltas, DS

momentum (MeV/c) δ -10 0 10 20 30 40

RATIO

-1 0 1 2 3 4 5 6 ratio of Data: DC deltas, DS and Simulation: DC deltas, DS

momentum (MeV/c) δ -10 0 10 20 30 40

’sδ number of reconstructed

0

200

400

600

800

1000

Simulation: DC deltas, DS

momentum (MeV/c) δ -10 0 10 20 30 40

RATIO

0 1 2 3 4 5 6 7 ratio of Data: DC deltas, DS and Simulation: DC deltas, DS

momentum (MeV/c) δ -10 0 10 20 30 40

’sδ number of reconstructed

0

200

400

600

800

1000

Simulation: DC deltas, DS

momentum (MeV/c) δ -10 0 10 20 30 40

RATIO

0

0.05

0.1

0.15

0.2

0.25 ratio of Data: DC deltas, DS and Simulation: DC deltas, DS