PC5 after rotation (arb units)

100 150 200 250 300

PC6 after rotation (arb units)

0

50

100

150

200

250

300

0 100 200 300 400 500 600 700 800 zones 4 and 3 combined

/ ndf

2χ 907.9 / 94 scale1 16.0± 4739 mean1 0.1± 125.4 sigma1 0.12± 17.46 scale2 29±

1.506e+04 mean2 0.0± 170.1 sigma2 0.03± 12.39

PC5 after rotation (arb units)

100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000 zones 4 and 3 combined

s87 [frac = 8.4%]