PC5 after rotation (arb units)

0 50 100 150 200 250 300

PC6 after rotation (arb units)

0

50

100

150

200

250

300

0

100

200

300

400

500

600

PC5 after rotation (arb units)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

PC5 after rotation (arb units)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

PC5 after rotation (arb units)

0 50 100 150 200 250 300 1

10

210

3 10

410