/ ndf

2χ 604.5 / 84 scale1 12.7±

2469 mean1 0.1±

104.3 sigma1 0.14± 15.03 scale2 28±

1.303e+04 mean2 0.0±

148.7 sigma2 0.02± 11.13

PC5 after rotation (arb units)

100 150 200 250 300 muons

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000 zones 4 and 3 combined