PC5 after rotation (arb units)

0 50 100 150 200 250 300

PC6 after rotation (arb units)

0

50

100

150

200

250

300

0 50 100 150 200 250 300 350

ZONE 4 - rotated

PC5 after rotation (arb units)

0 50 100 150 200 250 300

PC6 after rotation (arb units)

0

50

100

150

200

250

300

0 50 100 150 200 250 300 350 400 450 ZONE 3 - rotated

PC5 after rotation (arb units)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

projection of zones 4 and 3

PC5 after rotation (arb units)

0 50 100 150 200 250 300 0 2000

4000

6000

8000

10000

12000

14000

projection of zones 4 and 3