A (cm)

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

(0)_μP

0.980

0.985

0.990

0.995

1.000

0.2 cm in x or y ± yθ or xθ 3 mr in ± 0.2 cm in x or y ± yθ or xθ 3 mr in ±