x (cm)

-5 -4 -3 -2 -1 0 1 2 3 4 5 y (cm)

-5 -4 -3 -2 -1 0 1 2 3 4 5 H61515

Entries 1846667 Mean x 0.1904 Mean y -0.04219 RMS x 0.4371 RMS y 0.6131

0 500 1000

1500

2000

2500

3000

3500

4000

Beam profile for nominal tune (2006)