half window (ns)

100 200 300 400 500 600 700

> (rad) yθ s76 <

0.016

0.018

0.02

0.022

0.024

0.026

0.028

0.03

0.032

0.034

no iterations (old algo.) recover 0.05cm recover 0.1cm recover 0.2cm recover 0.3cm