H61101 Entries 76027 Mean 46.39 RMS 50.09

width (ns)

0 50 100 150 200 250 300 events

0

2000

4000

6000_{H61101}

H61101

Entries 76027 Mean 46.39 RMS 50.09

0 50 100 150 200 250 300 1 10 210 310 wire 1