max /E_e x = E

0.0 0.2 0.4 0.6 0.8 1.0

A

-0.3

-0.2

-0.1 0.0 0.1 0.2 0.3 0.4 0.5 0.6 asymmetry_for_scan_eta 0.1±

SMη = η