μe/W e x = E

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 θ cos

-1.0

-0.8

-0.6

-0.4

-0.2 0.0 0.2 0.4 0.6 0.8 1.0 -0.3

-0.2

-0.1 0.0 0.1 0.2 0.3 -3 10×

xi deriv (xi*delta constant)